PLOT PLUS for FERRET

USERS GUIDE

Version 3.10 April 1994

The version of PLOT PLUS embedded in FERRET lacks the commands "@" and "RD" and support for non-GKS output devices and metafiles.

A fully functional, stand-alone version of PLOT PLUS including source code may be obtained from

Plot Plus Graphics P.O. Box 4 Sequim, WA, 98382